Time, days

Fractionwater

0 250 500 750 1000 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8

30x30 Fine 6x6 Subgrid 3x3 Subgrid 6x6 Avg K 6x6 Avg K, order 2